Voyager directories are ordered in a manner that clearly separates various
components of the Voyager Magnetometer Processing System.  All current
production elements are contained under the root directory VOYAGER.  Testing
of new procedures will be performed under a separate root directory named
TEST.


The VOYAGER root directory contains the following subdirectories:

   COMMAND - contains all command procedures

   DATA - contains subdirectories holding all input and output data files

   SOURCE - contains subdirectories holding source files for Voyager 
            processing routines

   EXECUTABLE - contains all Voyager processing executables

   INFORMATION - contains documentation on Voyager processing


The VOYAGER.DATA subdirectory contains the following subdirectories:

   EDR - contains reblocked EDR's 

   ALIGNMENT - contains boom and sensor alignment data

   ZERO - contains zero offset files

   SENSITIVITY - contains range sensitivity files

   FLAG -      contains switching vector files

   SEDR -      contains navigation and pointing vector data

   FILTER -    contains parameters and coefficient files for Mish 
               filter

   DETAIL -    holds detail output data from Voyager EDR processing.

   SUMMARY -   holds summary output data from Voyager EDR processing

   LOG -       holds log files produced from Voyager EDR processing

   QUICKLOOK - holds both input and output temporary data used for 
               Voyager QEDR processing

   ROLL -      holds filtered ASCII 48 second averages used for roll
               analysis

   HOUR - holds hour averages calculated from summary output data


The VOYAGER.SOURCE subdirectory contains the following subdirectories:

   VOYPROD - contains Voyager EDR Production source code

   EDRBLOCK - contains EDR reblocking procedure source code

   EDRREAD - contains EDR header information extraction source code

   FILTER - contains Mish filter procedures source code

   PLOT - contains plotting routines source code
