\begin{manpage}{Safire Data Analysis System}{set\_eol}{Version 1.0}

\subtitle{Purpose}
	Sets the current Execution Order List (EOL) for the specified Process
        Control Table (PCT).

\subtitle{C Syntax}
    \#include \"defs.h\"\\
    \#include \"safire.h\"\\
    \vbox{\vspace{0.075in}}\\
\function{void set\_eol(char *PCTname, char *EOL)}\hbox{\hfill}

\subtitle{FORTRAN Syntax}
    CHARACTER PCTname*32, EOL*64 \\
    FSET\_EOL(PCTname, EOL)

\subtitle{PDT Entry}
    STRING : PCTname : 32 ; \\
    STRING : EOL : 64 ;

\subtitle{PCT Entry}
    a : DS : SET\_EOL : PCTname, EOL ;

\subtitle{Remarks}
    {\bf set\_eol} sets the current Execution Order List (EOL) for
    the PCT specified by {\em PCTname} to the string specified by {\em EOL}. 
    If {\em PCTname} is not a valid PCT name, {\bf set\_eol}
    aborts the program and returns an error message.

\subtitle{See Also}
    {\bf get\_eol}, {\bf get\_eoi}, {\bf set\_eoi}

\subtitle{Author}
    John Burton, G \& A Technical Software Inc.  07/08/91

\end{manpage}

