\begin{manpage}{Safire Data Analysis System}{set\_eoi}{Version 1.0}

\subtitle{Purpose}
	Sets the current Execution Order Index (EOI) for the specified Process
        Control Table (PCT).

\subtitle{C Syntax}
    \#include \"defs.h\"\\
    \#include \"safire.h\"\\
    \vbox{\vspace{0.075in}}\\
\function{void set\_eoi(char *PCTname, int EOI)}\hbox{\hfill}

\subtitle{FORTRAN Syntax}
    CHARACTER PCTNAME*32 \\
    INTEGER*4 EOI \\
    FSET\_EOI(PCTNAME, EOI)

\subtitle{PDT Entry}
    STRING : PCTname  : 32 ; \\
    INT    : EOI ;

\subtitle{PCT Entry}
    a : DS : SET\_EOI : PCTname, EOI ;

\subtitle{Remarks}
    {\bf set\_eoi} sets the current Execution Order Index (EOI) for
    the PCT specified by {\em PCTname} to the value specified by {\em EOI}.
    If {\em PCTname} is not a valid PCT name, {\bf set\_eol}
    aborts the program and returns an error message.

\subtitle{See Also}
    {\bf get\_eoi}, {\bf get\_eol}, {\bf set\_eol}

\subtitle{Author}
    John Burton, G \& A Technical Software Inc.  07/08/91

\end{manpage}

