\begin{manpage}{Safire Data Analysis System}{ise}{Version 1.0}

\subtitle{Purpose}
	Provides a looping construct within a PCT node via Increment and
        Skip when Equal. 

\subtitle{PDT Entry}
    INT    : Count; \\
    INT    : End  ; \\
    INT    : Index;

\subtitle{PCT Entry}
    a : DS : ISE : Count, End, Index ;

\subtitle{Remarks}
    {\bf ise} compares the value of {\em Count} to {\em End}. If {\em Count} is
    less than {\em End} then {\bf ise} sets the {\em EOI} for the current PCT
    to {\em Index} and increments {\em Count} by one. If {em Count} is greater 
    than or equal to {\em End} then {\bf ise} simply returns.

\subtitle{See Also}
    {\bf dsz}

\subtitle{Author}
    John Burton, G \& A Technical Software Inc.  10/09/91

\end{manpage}

