\begin{manpage}{Scientific Software System (\scubed)}{get\_eol}{Version 1.0}

\subtitle{Purpose}
	Gets the current Execution Order List (EOL) for the specified Process
        Control Table (PCT).

\subtitle{C Syntax}
    \#include \"defs.h\"\\
    \#include \"safire.h\"\\
    \vbox{\vspace{0.075in}}\\
\hbox{\hfill}\function{char *get\_eol(char *PCTname)}\hbox{\hfill}    

\subtitle{FORTRAN Syntax}
    CHARACTER*64 FGET\_EOL(PCTNAME)\\
    CHARACTER PCTNAME*32 

\subtitle{PDT Entry}
    STRING : PCTname : 32 ; \\
    STRING : EOL : 64 ;

\subtitle{PCT Entry}
    a : DS : GET\_EOL : PCTname, EOL ;
    
\subtitle{Remarks}
    {\bf get\_eol} gets the current Execution Order List (EOL)for
    the PCT specified by {\em PCTname}. The returned value is a NULL terminated
    character string. If {\em PCTname} is not a valid PCT name,
    {\bf get\_eol}
    aborts the program and returns an error message.

\subtitle{See Also}
    {\bf set\_eol}, {\bf get\_eoi}, {\bf set\_eoi}

\subtitle{Author}
    John Burton, G \& A Technical Software Inc.  07/08/91

\end{manpage}

